– 1 –

Table 1. Log of Spectroscopic Observations

Aperture UT Julian Size P.A. Res. Range FITS Date Date Code (^{′′}) (^o) (Å) (Å) file (1) (2) (3) (4) (5) (6) (7) (8)

1990 Dec 17 48243.09 H 4 × 10 120 10 3900–7000 n58243h 1991 Jan 23 48280.09 H 4 × 10 183 10 3900–7020 n58280h 1991 Feb 23 48311.07 H 4 × 10 230 10 3900–7020 n58311h 1991 Mar 09 48325.07 H 4 × 10 59 10 3900–7020 n58325h 1992 May 04 48746.84 H 4 × 10 90 10 3346–10300 n58746h 1992 Jun 25 48798.85 H 4 × 10 61 10 3198–10200 n58798h H 3.0-m Lick Observatory + KAST Spectrograph