– 1 –

Table 1. V -Band CCD Photometry

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

50466.62 A 13.584 ± 0.021 9.17 ± 0.29 50467.62 A 13.594 ± 0.023 9.03 ± 0.31 50483.53 A 13.739 ± 0.018 7.18 ± 0.21 50487.55 A 13.706 ± 0.030 7.58 ± 0.37 50491.53 A 13.768 ± 0.013 6.84 ± 0.15 50509.49 A 13.688 ± 0.025 7.80 ± 0.31 50510.49 A 13.688 ± 0.025 7.80 ± 0.31 50518.53 A 13.694 ± 0.020 7.73 ± 0.25 50519.52 A 13.710 ± 0.032 7.53 ± 0.39 50521.47 A 13.682 ± 0.015 7.88 ± 0.19 50522.50 A 13.804 ± 0.012 6.43 ± 0.13 50549.44 A 13.601 ± 0.054 8.93 ± 0.73 50550.22 C 13.787 ± 0.008 8.55 ± 0.04 50555.55 A 13.686 ± 0.021 7.83 ± 0.26 50568.42 A 13.675 ± 0.021 7.97 ± 0.27 50569.36 A 13.698 ± 0.017 7.68 ± 0.21 50574.38 A 13.690 ± 0.022 7.78 ± 0.27 50579.45 A 13.782 ± 0.021 6.68 ± 0.24 50580.41 A 13.742 ± 0.022 7.14 ± 0.26 50581.46 A 13.733 ± 0.029 7.25 ± 0.35 50582.46 A 13.628 ± 0.023 8.57 ± 0.30 50594.14 C 13.750 ± 0.013 8.76 ± 0.07 50599.07 C 13.818 ± 0.018 8.39 ± 0.09 50602.18 C 13.845 ± 0.018 8.25 ± 0.09 50602.35 A 13.561 ± 0.021 9.49 ± 0.29 50604.39 A 13.597 ± 0.022 8.99 ± 0.30 50606.38 A 13.624 ± 0.014 8.63 ± 0.19 50607.37 A 13.718 ± 0.030 7.43 ± 0.36 50614.07 C 13.707 ± 0.009 9.00 ± 0.05 50632.06 C 13.649 ± 0.033 9.34 ± 0.20 50636.34 B 13.581 ± 0.007 8.62 ± 0.10 50865.54 A 13.452 ± 0.024 11.10 ± 0.37 50866.50 A 13.402 ± 0.018 11.89 ± 0.29 50868.49 A 13.415 ± 0.012 11.68 ± 0.19

– 2 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

50873.57 A 13.368 ± 0.030 12.46 ± 0.50 50874.56 A 13.372 ± 0.021 12.39 ± 0.35 50876.56 A 13.326 ± 0.018 13.17 ± 0.31 50908.48 E 13.403 ± 0.016 11.90 ± 0.26 50930.43 E 13.233 ± 0.015 14.92 ± 0.29 50959.38 A 13.165 ± 0.013 16.20 ± 0.26 50963.49 B 13.132 ± 0.007 16.47 ± 0.15 50966.35 A 13.154 ± 0.022 16.43 ± 0.45 50980.25 D 13.257 ± 0.017 13.91 ± 0.27 50981.37 B 13.252 ± 0.006 14.05 ± 0.11 50983.28 D 13.231 ± 0.017 14.33 ± 0.28 50984.29 D 13.227 ± 0.017 14.40 ± 0.28 50985.24 D 13.247 ± 0.017 14.07 ± 0.28 50987.36 B 13.197 ± 0.020 15.13 ± 0.40 50987.45 A 13.290 ± 0.022 13.81 ± 0.40 50989.34 A 13.240 ± 0.022 14.74 ± 0.41 50992.29 D 13.330 ± 0.017 12.77 ± 0.26 50992.44 B 13.299 ± 0.007 13.17 ± 0.13 50993.34 A 13.344 ± 0.013 12.86 ± 0.22 50993.37 B 13.316 ± 0.003 12.86 ± 0.05 50994.38 B 13.320 ± 0.005 12.79 ± 0.09 50994.40 E 13.390 ± 0.050 12.12 ± 0.83 50995.23 D 13.329 ± 0.017 12.79 ± 0.26 50995.40 B 13.285 ± 0.016 13.43 ± 0.30 50996.24 D 13.351 ± 0.017 12.46 ± 0.25 50996.40 B 13.348 ± 0.010 12.29 ± 0.17 50997.24 D 13.336 ± 0.017 12.68 ± 0.25 50997.41 A 13.278 ± 0.054 14.03 ± 0.98 50998.25 D 13.347 ± 0.017 12.52 ± 0.25 51006.22 D 13.358 ± 0.017 12.36 ± 0.25 51006.40 E 13.331 ± 0.027 13.13 ± 0.47 51007.23 D 13.312 ± 0.017 13.05 ± 0.26 51008.23 D 13.255 ± 0.017 13.94 ± 0.27 51009.24 D 13.297 ± 0.017 13.28 ± 0.26

– 3 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

51010.32 A 13.340 ± 0.022 12.93 ± 0.38 51011.23 D 13.322 ± 0.017 12.89 ± 0.26 51011.38 E 13.400 ± 0.044 11.95 ± 0.72 51012.23 D 13.341 ± 0.017 12.61 ± 0.25 51013.23 D 13.342 ± 0.017 12.59 ± 0.25 51013.36 A 13.321 ± 0.028 13.26 ± 0.49 51014.22 D 13.354 ± 0.017 12.42 ± 0.25 51015.23 D 13.361 ± 0.017 12.31 ± 0.25 51015.37 A 13.400 ± 0.022 11.93 ± 0.36 51017.32 A 13.370 ± 0.022 12.42 ± 0.37 51017.33 B 13.356 ± 0.004 12.15 ± 0.07 51018.24 D 13.351 ± 0.017 12.46 ± 0.25 51018.34 B 13.320 ± 0.004 12.79 ± 0.07 51022.22 D 13.308 ± 0.017 13.11 ± 0.26 51023.22 D 13.313 ± 0.017 13.03 ± 0.26 51025.21 D 13.324 ± 0.017 12.86 ± 0.26 51026.18 D 13.384 ± 0.017 11.98 ± 0.24 51030.25 E 13.400 ± 0.003 11.95 ± 0.05 51035.28 E 13.417 ± 0.008 11.68 ± 0.13 51052.26 A 13.330 ± 0.022 13.10 ± 0.38 51163.58 A 13.405 ± 0.017 11.84 ± 0.28 51175.58 E 13.421 ± 0.011 11.61 ± 0.18 51176.64 A 13.460 ± 0.015 10.97 ± 0.23 51197.58 E 13.461 ± 0.015 10.98 ± 0.23 51204.55 E 13.512 ± 0.002 10.20 ± 0.03 51221.53 E 13.298 ± 0.022 13.71 ± 0.40 51261.53 A 13.379 ± 0.014 12.27 ± 0.23 51265.46 E 13.303 ± 0.015 13.62 ± 0.27 51276.45 A 13.285 ± 0.017 13.90 ± 0.31 51276.49 E 13.327 ± 0.007 13.20 ± 0.12 51277.46 A 13.312 ± 0.015 13.42 ± 0.26 51282.45 A 13.323 ± 0.015 13.23 ± 0.26 51284.48 A 13.253 ± 0.019 14.49 ± 0.35 51285.52 A 13.268 ± 0.020 14.21 ± 0.37

– 4 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

51287.48 A 13.275 ± 0.020 14.08 ± 0.37 51294.47 E 13.200 ± 0.015 15.57 ± 0.30 51295.38 E 13.214 ± 0.011 15.29 ± 0.21 51306.45 A 13.320 ± 0.020 13.28 ± 0.35 51308.44 A 13.331 ± 0.013 13.09 ± 0.23 51318.13 C 13.359 ± 0.096 11.37 ± 0.76 51336.39 A 13.396 ± 0.036 11.99 ± 0.59 51336.41 E 13.379 ± 0.002 12.30 ± 0.03 51339.37 A 13.448 ± 0.020 11.16 ± 0.31 51345.29 E 13.423 ± 0.020 11.58 ± 0.32 51345.34 A 13.450 ± 0.022 11.13 ± 0.34 51346.41 A 13.504 ± 0.023 10.31 ± 0.34 51347.37 A 13.464 ± 0.020 10.91 ± 0.31 51349.25 D 13.434 ± 0.017 11.28 ± 0.23 51350.23 D 13.425 ± 0.017 11.40 ± 0.23 51351.25 D 13.507 ± 0.017 10.31 ± 0.22 51351.28 E 13.401 ± 0.019 11.94 ± 0.31 51352.35 A 13.508 ± 0.028 10.25 ± 0.41 51354.28 D 13.471 ± 0.017 10.78 ± 0.22 51361.22 D 13.516 ± 0.017 10.20 ± 0.22 51362.22 D 13.467 ± 0.017 10.84 ± 0.23 51363.22 D 13.488 ± 0.017 10.56 ± 0.22 51364.23 D 13.422 ± 0.017 11.45 ± 0.24 51368.22 D 13.543 ± 0.017 9.86 ± 0.21 51368.37 B 13.402 ± 0.007 11.37 ± 0.12 51370.32 A 13.500 ± 0.022 10.37 ± 0.33 51372.22 D 13.488 ± 0.017 10.56 ± 0.22 51374.21 D 13.478 ± 0.017 10.69 ± 0.22 51374.27 E 13.488 ± 0.012 10.56 ± 0.18 51375.23 D 13.498 ± 0.017 10.43 ± 0.22 51375.33 A 13.520 ± 0.022 10.07 ± 0.32 51376.20 D 13.416 ± 0.017 11.53 ± 0.24 51377.21 D 13.545 ± 0.017 9.84 ± 0.21 51379.21 D 13.484 ± 0.017 10.61 ± 0.22

– 5 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

51380.21 D 13.446 ± 0.017 11.12 ± 0.23 51381.20 D 13.524 ± 0.017 10.10 ± 0.21 51390.20 D 13.626 ± 0.017 8.87 ± 0.19 51391.20 D 13.685 ± 0.017 8.22 ± 0.18 51392.19 D 13.643 ± 0.017 8.68 ± 0.19 51393.19 D 13.609 ± 0.017 9.07 ± 0.20 51394.19 D 13.552 ± 0.017 9.75 ± 0.21 51396.17 D 13.619 ± 0.017 8.95 ± 0.20 51397.18 D 13.709 ± 0.017 7.96 ± 0.18 51400.18 D 13.610 ± 0.017 9.06 ± 0.20 51402.17 D 13.670 ± 0.017 8.38 ± 0.19 51403.17 D 13.662 ± 0.017 8.47 ± 0.19 51404.30 A 13.600 ± 0.022 8.95 ± 0.30 51408.29 A 13.610 ± 0.022 8.81 ± 0.30 51550.64 A 13.631 ± 0.015 8.53 ± 0.20 51552.61 E 13.607 ± 0.010 8.85 ± 0.14 51553.62 E 13.607 ± 0.032 8.85 ± 0.43 51554.58 E 13.572 ± 0.054 9.34 ± 0.76 51577.52 E 13.642 ± 0.027 8.38 ± 0.35 51583.61 A 13.658 ± 0.013 8.18 ± 0.17 51584.51 E 13.807 ± 0.027 6.37 ± 0.31 51587.58 A 13.705 ± 0.024 7.59 ± 0.30 51588.47 E 13.739 ± 0.058 7.16 ± 0.70 51603.40 A 13.700 ± 0.022 7.65 ± 0.27 51606.56 E 13.780 ± 0.015 6.68 ± 0.17 51611.45 E 13.705 ± 0.024 7.58 ± 0.30 51617.56 A 13.715 ± 0.020 7.47 ± 0.24 51618.55 E 13.689 ± 0.077 7.78 ± 0.97 51619.41 E 13.792 ± 0.025 6.54 ± 0.29 51634.42 A 13.717 ± 0.058 7.44 ± 0.70 51635.51 E 13.741 ± 0.022 7.14 ± 0.26 51640.43 E 13.865 ± 0.019 5.73 ± 0.20 51641.42 A 13.780 ± 0.017 6.70 ± 0.20 51645.48 A 13.907 ± 0.022 5.32 ± 0.22

– 6 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

51659.38 E 13.808 ± 0.010 6.36 ± 0.11 51660.34 E 13.770 ± 0.033 6.79 ± 0.39 51669.38 E 13.860 ± 0.019 5.78 ± 0.20 51670.31 E 13.841 ± 0.001 5.99 ± 0.01 51679.36 E 13.832 ± 0.036 6.09 ± 0.40 51687.31 E 13.808 ± 0.019 6.36 ± 0.21 51711.36 E 13.821 ± 0.031 6.21 ± 0.35 51717.35 E 13.945 ± 0.011 4.90 ± 0.11 51718.26 D 13.793 ± 0.017 7.10 ± 0.17 51719.26 D 13.891 ± 0.017 6.18 ± 0.15 51720.22 D 13.936 ± 0.017 5.78 ± 0.15 51720.34 A 13.950 ± 0.022 4.89 ± 0.22 51722.22 D 13.950 ± 0.017 5.66 ± 0.14 51723.22 D 13.923 ± 0.017 5.90 ± 0.15 51724.22 D 13.894 ± 0.017 6.15 ± 0.15 51725.24 D 13.816 ± 0.017 6.88 ± 0.16 51725.35 A 13.870 ± 0.022 5.71 ± 0.23 51728.24 D 13.871 ± 0.017 6.36 ± 0.16 51729.21 D 13.874 ± 0.017 6.33 ± 0.15 51730.21 D 13.836 ± 0.017 6.68 ± 0.16 51731.21 D 13.861 ± 0.017 6.45 ± 0.16 51732.21 D 13.880 ± 0.017 6.28 ± 0.15 51733.21 D 13.817 ± 0.017 6.87 ± 0.16 51733.32 E 13.866 ± 0.016 5.72 ± 0.17 51734.21 D 13.766 ± 0.017 7.37 ± 0.17 51736.32 E 13.798 ± 0.019 6.47 ± 0.22 51750.22 D 13.786 ± 0.017 7.17 ± 0.17 51750.32 A 13.740 ± 0.022 7.17 ± 0.26 51751.32 A 13.771 ± 0.031 6.80 ± 0.36 51752.28 E 13.723 ± 0.011 7.36 ± 0.13 51753.18 D 13.758 ± 0.017 7.45 ± 0.17 51753.27 E 13.735 ± 0.013 7.21 ± 0.16 51754.18 D 13.756 ± 0.017 7.47 ± 0.17 51755.19 D 13.668 ± 0.017 8.40 ± 0.19

– 7 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

51756.19 D 13.724 ± 0.017 7.80 ± 0.18 51765.26 E 13.815 ± 0.019 6.28 ± 0.21 51768.28 E 13.778 ± 0.031 6.70 ± 0.36 51902.61 A 13.764 ± 0.030 6.88 ± 0.35 51912.64 A 13.830 ± 0.021 6.14 ± 0.23 51919.58 E 13.653 ± 0.022 8.24 ± 0.29 51926.59 E 13.689 ± 0.022 7.78 ± 0.28 51933.53 A 13.706 ± 0.025 7.58 ± 0.31 51935.52 E 13.711 ± 0.022 7.50 ± 0.27 51941.60 E 13.715 ± 0.022 7.45 ± 0.27 51950.45 E 13.752 ± 0.022 7.01 ± 0.26 51953.52 E 13.728 ± 0.022 7.30 ± 0.27 51958.49 E 13.784 ± 0.022 6.63 ± 0.25 51979.44 E 13.785 ± 0.022 6.62 ± 0.25 51986.45 A 13.825 ± 0.023 6.19 ± 0.25 52000.45 E 13.838 ± 0.022 6.02 ± 0.24 52010.40 E 13.853 ± 0.022 5.86 ± 0.24 52048.32 A 13.822 ± 0.027 6.23 ± 0.30 52049.46 E 13.795 ± 0.022 6.51 ± 0.25 52054.32 A 13.857 ± 0.013 5.85 ± 0.14 52071.37 A 13.779 ± 0.037 6.71 ± 0.42 52079.37 A 13.718 ± 0.031 7.43 ± 0.38 52082.41 A 13.719 ± 0.037 7.42 ± 0.45 52083.27 E 13.752 ± 0.022 7.01 ± 0.26 52084.38 A 13.658 ± 0.038 8.18 ± 0.49 52086.37 A 13.658 ± 0.035 8.18 ± 0.45 52102.36 A 13.677 ± 0.031 7.94 ± 0.39 52104.28 E 13.718 ± 0.022 7.42 ± 0.27 52104.35 A 13.631 ± 0.021 8.53 ± 0.28 52105.31 E 13.662 ± 0.022 8.12 ± 0.28 52106.26 E 13.701 ± 0.022 7.63 ± 0.27 52107.26 E 13.718 ± 0.022 7.42 ± 0.27 52108.27 E 13.716 ± 0.022 7.44 ± 0.27 52108.35 A 13.656 ± 0.040 8.21 ± 0.51

– 8 –

Table 1—Continued

Julian Date V F_λ(5100 Å) (-2400000) Source (mag) (ergs s^{−1} cm^{−2} Å^{−1}) (1) (2) (3) (4)

52109.27 E 13.715 ± 0.022 7.45 ± 0.27 52110.27 E 13.718 ± 0.022 7.42 ± 0.27 52132.29 A 13.693 ± 0.039 7.74 ± 0.49 52134.27 E 13.711 ± 0.022 7.50 ± 0.27 52135.24 E 13.782 ± 0.022 6.65 ± 0.25 52138.32 A 13.740 ± 0.033 7.17 ± 0.39 52140.24 E 13.765 ± 0.022 6.85 ± 0.26 52264.62 A 13.773 ± 0.028 6.78 ± 0.32 Codes for Data Origin A: 0.6-m Telescope, Crimean Laboratory of the Sternberg Astronomical Institute + pulse-counting UBV photometer, 14^{′′}.3 aperture.

B: 1.25-m Telescope, Crimean Astrophysical Observatory + pulse-counting Photometer-Polarimeter, 15^{′′} aperture C: 1.56-m Telescope, Shanghai Astronomical Observatory + CCD, 10^{′′} aperture.

D: 0.48-m and 0.6m Telescopes of Ulugbek Astronomical Institute + pulse-counting UBV photometer, 14^{′′}.3 aperture.

E: 1-m and 0.6-m Telescopes of the Special Astrophysical Observatory + CCD, 10^{′′} aperture.