0.6 0.8 1

0 2 4 6 8 λ

4 5 6

0 2 4 6 8

R_{out} (fm)

4 5 6

0 2 4 6 8

R_{side} (fm)

4 5 6

0 2 4 6 8

R_{long} (fm)

E_{beam} (A^.GeV)

0 2 4 6

0 2 4 6 8

R^0 (fm/c)

4 5 6

0 2 4 6 8

R_⊥ (fm)

4 5 6

0 2 4 6 8

R_{ΒΒ} (fm)

E_{beam} (A^.GeV)

y = y_{cm} Α 0.35 11Ψσ_T p_T = 0.1-0.3 GeV/c E895 data RQMD cascade RQMD meanfield