0.6 0.8 1

0 0.1 λ

0.6 0.8 1

0 0.1

E895

0.6 0.8 1

0 0.1

Cascade

0.6 0.8 1

0 0.1

Meanfield

4 5 6

0 0.1

R_{side} (fm)

4 5 6

0 0.1

4 5 6

0 0.1

4 5 6

0 0.1

3 4 5 6 7

0 0.1

R_{long} (fm)

2 AGeV

3 4 5 6 7

0 0.1

4 AGeV

3 4 5 6 7

0 0.1

6 AGeV

3 4 5 6 7

0 0.1 m_T-m_π (GeV/c)

8 AGeV