0.2

0.6

1

0 200

Au(4 AGeV)Au b = 4-8 fm -0.6 Λ y_{cm} Λ 0.6 p_T = 0-0.4 GeV/c

20

40

0 200 out

20

40

0 200 side

20

40

0 200 long

-16

0

16

0 200 out-long

-16

0

16

0 200 out-side

-16

0

16

0 200 400 side-long