CO_2 LASER PHOTOACOUSTIC SPECTROSCOPY OF SOME HAZARDOUS MOLECULES

S. N. THAKUR, Department of Physics, Banaras Hindu University, Varanasi - 221 005, India; R. L. PRASAD, Department of Physics, IIT Kanpur, India; G. C. BHAR, Department of Physics, Burdwan University, Burdwan, India.